<template>
  <div class="alarmHandBox">
    <div class="alarmTop">
      <div class="alarmButtonGroup">
        <el-button type="primary">查询</el-button>
        <el-button type="primary">今日告警</el-button>
        <el-button type="primary">最近三日告警</el-button>
        <el-button type="primary">最近一周告警</el-button>
        <el-button type="primary">批量处理</el-button>
        <el-button type="primary">查看详情</el-button>
        <el-button type="primary">导出</el-button>
        <el-button type="primary">导出处理结果</el-button>
        <el-button type="primary">导出图片</el-button>
        <el-button type="primary">手动刷新</el-button>
      </div>
    </div>
    <div class="alarmContain">
      <div class="alarmTable">
        <el-table
          ref="multipleTable"
          :data="tableData"
          stripe
          border
          tooltip-effect="dark"
          style="width: 100%"
          @selection-change="handleSelectionChange"
          height="calc(100% - 40px)"
          @row-click="handleRowClick"
        >
          <el-table-column min-width="35">
            <template slot-scope="scope">
              <span>{{ (page - 1) * pageSize + scope.$index + 1 }}</span>
            </template>
          </el-table-column>
          <el-table-column type="selection" min-width="25"> </el-table-column>
          <el-table-column
            prop="alarmTime"
            label="告警时间"
            min-width="135"
            :show-overflow-tooltip="true"
            :formatter="dateFormat"
          >
          </el-table-column>
          <el-table-column prop="alarmLevel" label="告警级别" min-width="75">
          </el-table-column>
          <el-table-column
            prop="lineName"
            label="线路"
            min-width="105"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="meid"
            label="杆塔"
            min-width="115"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="orientationName"
            label="监拍朝向"
            min-width="95"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="companyName"
            label="单位"
            min-width="75"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="alarmInfo"
            label="告警原因"
            min-width="155"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="source"
            label="分析来源"
            min-width="105"
            :show-overflow-tooltip="true"
          >
            <template>后端分析</template></el-table-column
          >
          <el-table-column
            prop="clearDistace"
            label="净空距离"
            min-width="105"
            :show-overflow-tooltip="true"
            ><template>未分析</template>
          </el-table-column>
          <el-table-column
            prop="distanceLevel"
            label="距离分级"
            min-width="85"
            :show-overflow-tooltip="true"
          >
          </el-table-column>
          <el-table-column
            prop="isRead"
            label="是否已读"
            min-width="95"
            fixed="right"
          >
            <template slot-scope="scope">
              <span v-if="scope.row.isRead == 0">未读</span>
              <span v-if="scope.row.isRead == 1">已读</span>
            </template>
          </el-table-column>
        </el-table>
        <div class="pageNation">
          <el-pagination
            @current-change="handleCurrentChange"
            :current-page="page"
            :page-size="pageSize"
            layout=" prev, pager, next, jumper,total"
            :total="total"
          >
          </el-pagination>
        </div>
      </div>
      <div class="alarmPic">
        <div class="imgshow"><img :src="photoPic" /></div>
        <div class="editorBtn">
          <el-button type="primary">处理</el-button>
          <el-button type="primary">查看操作详情</el-button>
          <el-button type="primary">设置非警告区域</el-button>
          <el-button type="primary">主动拍照</el-button>
          <el-button type="primary">转向GT</el-button>
          <el-button type="primary">复制</el-button>
          <el-button type="primary">历史图</el-button>
        </div>
      </div>
    </div>
  </div>
</template>

<script>
//import { list } from '@/utils/api/index';
import moment from "moment";
export default {
  data() {
    return {
      photoPic: "",

      tableData: [],
      multipleSelection: [],
      page: 1, // 当前页数
      pageSize: 20, // 每页数量
      total: 0, //总条数
    };
  },
  methods: {
    handleCurrentChange(val) {
      console.log(`当前页: ${val}`);
      this.page = val;
      this.getTableList();
    },
    getTableList() {
      this.tableData = [
        {
          alarmId: "336a07658a964309855e7084013e545f",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230505040011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683230415000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230505040011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 1,
          readStatus: null,
          readTime: 1683279356000,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "2992fedf674f476cb647e3f3ebd4811b",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230505040010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683230407000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230505040010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "f76f1ad99b1149b4aaeedeaf04341f1f",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230505030011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683226814000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230505030011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 1,
          readStatus: null,
          readTime: 1683279594000,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "69a3a5c40801459186d8811b9559a940",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230505030010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683226808000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230505030010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "fa55719388714695a708c18fa06bd7f5",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230505020010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683223213000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230505020010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "d9aeeb589644446da5f6f93c8cf6bccb",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230505020012_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683223211000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230505020012_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 1,
          readStatus: null,
          readTime: 1683279593000,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "6844db45af574a01ab4eb7bc438ce481",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230505000010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683216013000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230505000010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "c29a2e93ac394e2ab347adb45c3ffe60",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230505000010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683216009000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230505000010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "e47de444a3a246edb84306a88299dd20",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504220011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683208814000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504220011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "f33ff5c8b8d24128903abb8421883128",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230504220010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683208808000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230504220010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "e10131c6816241d1bed61bf6eb3e1a0b",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504210011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683205213000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504210011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "f35b8d26bdf74223aa22816ec031807e",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230504210011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683205210000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230504210011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "1afae36ec37c488a8db16e0137fc13b9",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504200011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683201613000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504200011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "135133aeb9a04bac8c2b2164d21fa7e9",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504041712_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683145036000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504041712_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "d53a799629cc4dab831a29aebf23c5f4",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504030011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683140415000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504030011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "30a4b08aef0b4b67a32827241b5c3e64",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230504030010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683140409000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230504030010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "3449ac7086e448b1b10303235566eab8",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504020012_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683136816000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504020012_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "93ce7bc8bf2947c2b95b157cc8f7bfe0",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "2ab9a074-ca3a-4223-aa79-d17b609c69d3",
          towerName: "XYIGQ10C221000003",
          monitorPointId: "1055cc8c-07c4-e09b-846d-543aecc8c8c1",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000003_20230504020010_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683136809000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000003/202305/backend/XYIGQ10C221000003_20230504020010_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "c18c871a-1d2b-4022-805a-a9a0b4caa4be",
          meid: "XYIGQ10C221000003",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "db52df4e3fdd4b9a8b56224737e9f70f",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230504010012_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683133217000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230504010012_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
        {
          alarmId: "81dd16f4aedc44efa003df11d924e692",
          earlyAlarmId: null,
          companyId: "f7d966d1-f3d1-4802-946d-ad93e1ee1b9b",
          companyName: "xytest",
          teamId: null,
          teamName: null,
          lineId: "8cee6df6-46c7-4f6d-abfa-b2cfecdcf31f",
          lineName: "i1测试线路-SH",
          logicTowerId: "38fb2783-4d41-490d-8b80-806ecb4822e0",
          towerName: "XYIGQ10C221000080",
          monitorPointId: "8f0ebae8-e314-1d43-c700-2a50139f5489",
          orientation: "10",
          orientationName: "白天",
          photoName: "XYIGQ10C221000080_20230503230011_1_255_res.jpg",
          phtotUrl: "/",
          dangerCode: "0101",
          dangerName: "跨高铁(电铁)",
          alarmInfo: '["YanWu"]',
          alarmTime: 1683126013000,
          status: 0,
          outvalue: null,
          alarmFlag: null,
          collectConfigId: null,
          collectUser: null,
          analysersrc: "2",
          alarmObjects: null,
          photoPath:
            "/local/XYIGQ10C221000080/202305/backend/XYIGQ10C221000080_20230503230011_1_255_res.jpg",
          alarmLevel: "1",
          alarmSource: "1",
          isRead: 0,
          readStatus: null,
          readTime: null,
          readUserName: null,
          ifDispatch: null,
          dispatchState: null,
          dispatchTime: null,
          channel: 1,
          deviceId: "097ba6dc-9ece-4da4-a636-00eacc39fad5",
          meid: "XYIGQ10C221000080",
          dealTime: null,
          overTimeStatus: null,
          manufacturerCode: null,
          manufacturerName: null,
          sendWechat: null,
          presettingNum: null,
          presettingName: null,
          referencepicname: null,
          photoId: null,
          weatherStatus: null,
          jingKongLength: null,
          shuiPingLength: null,
          chuiZhiLength: null,
          companyIdSelect: null,
          timeStart: null,
          timeEnd: null,
          voltageCode: "5",
          voltageName: "220kV",
          alarmLevelName: null,
          alarmInfoName: null,
          ifDispatchLocationId: null,
          userId: null,
          earlyAlarmTime: null,
          lng: null,
          lat: null,
          timeExcel: null,
          alarmTimeExcel: null,
          sendPerson: null,
          readPerson: null,
          readTimeExcel: null,
          statusName: null,
          dealTimeDeal: null,
          dealPersonDeal: null,
          statusDeal: null,
          measureDeal: null,
          ramarkDeal: null,
          analyseName: null,
          workCount: null,
          photoserver: null,
          alarmDeal: [],
          photoEarlyAlarm: null,
          companyPath: null,
        },
      ];
      this.total = 36;
      this.photoPic =
        "http://180.166.218.222:8104/media" + this.tableData[0].photoPath;
    },

    handleSelectionChange(val) {
      this.multipleSelection = val;
    },
    handleRowClick(row) {
      //this.$refs.multipleTable.toggleRowSelection(row);
      console.log(row);
      this.photoPic = "http://180.166.218.222:8104/media" + row.photoPath;
    },
    dateFormat(row, column) {
      var date = row[column.property];
      if (date == undefined) {
        return "";
      }
      return moment(date).format("YYYY-MM-DD HH:mm:ss");
    },
  },
  created() {
    this.getTableList();
  },
};
</script>
<style lang="less">
.alarmHandBox {
  width: calc(100% - 32px);
  height: calc(100% - 32px);
  padding: 16px 16px;
  background: #ffffff;
  .alarmTop {
    padding: 0px 8px 16px 8px;
  }
  .alarmContain {
    display: flex;
    height: calc(100% - 48px);
    padding: 0px 8px;
    .alarmTable {
      width: 50%;
      height: 100%;
    }
    .pageNation {
      margin-top: 8px;
    }
    .alarmPic {
      width: 50%;
      height: 100%;
      display: flex;
      flex-direction: column;
      justify-content: space-between;
      .imgshow {
        width: 100%;
        height: 90%;
        img {
          width: 100%;
          height: 100%;
        }
      }
      .editorBtn {
        margin-top: 8px;
        border: 1px solid @border-color-base;
        padding: 2%;
        border-radius: 4px;
      }
      .editorBtn {
        display: flex;
        justify-content: flex-start;
      }
    }
  }
}
</style>
